The iPad Pro model MLMP2FD/A, also known as the 10.5-inch iPad Pro (1st generation), is expected to receive its final iPadOS update in the fall of 2026. This is based on historical trends of Apple providing software updates for 5-7 years, and this model was released in June 2017.